Stably continuous sigma frames

Phethiwe Precious Matutu

Stably continuous σ-frames have been studied by a number of authors including Madden and Walters-Wayland. We show that the categories of stably continuous σframes and compact regular bi σ-frames are equivalent. This is the analogue of the remarkable result of Banaschewski and Brümmer linking the stably continuous frames and compact regular biframes.